INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2992, 'EPSG', 2992, '+proj=lcc +lat_0=41.75 +lon_0=-120.5 +lat_1=43 +lat_2=45.5 +x_0=399999.9999984 +y_0=0 +ellps=GRS80 +nadgrids=AB_CSRS.DAC +units=ft +no_defs +type=crs', 'PROJCS["NAD83 / Oregon GIC Lambert (ft)",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","AB_CSRS.DAC"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",41.75],PARAMETER["central_meridian",-120.5],PARAMETER["standard_parallel_1",43],PARAMETER["standard_parallel_2",45.5],PARAMETER["false_easting",1312335.958],PARAMETER["false_northing",0],UNIT["foot",0.3048],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2992"]]');